-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.211693259179
cusum  =  0.115233504462
eta  =  0.542842317758
hl_amp_ratio  =  0.969990115073
kurtosis  =  -0.947084467381
n_points  =  394
period  =  0.653428170439
period_SNR  =  41.6820289744
period_log10FAP  =  -43.2430852794
period_uncertainty  =  0.000118874288896
phase_cusum  =  0.2318705701
phase_eta  =  0.404160614688
phi21  =  4.21691943206
phi31  =  2.788891013
quartile31  =  0.33
r21  =  0.448313656896
r31  =  0.398784617023
shapiro_w  =  0.977047085762
skewness  =  -0.0500919617061
slope_per10  =  -0.0796860075189
slope_per90  =  0.146663481626
stetson_k  =  0.852912530284
weighted_mean  =  11.8741822034
weighted_std  =  0.201427134544
