-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.93


######### Lightcurve features #########

amplitude  =  0.349805938194
cusum  =  0.174910606201
eta  =  0.503859981557
hl_amp_ratio  =  0.396633532413
kurtosis  =  -1.14663819189
n_points  =  105
period  =  0.593963090043
period_SNR  =  16.9012177463
period_log10FAP  =  -11.4982639994
period_uncertainty  =  0.000159728848437
phase_cusum  =  0.273591739493
phase_eta  =  0.0875523566736
phi21  =  0.827951726369
phi31  =  1.95635588308
quartile31  =  0.65
r21  =  0.553652845968
r31  =  0.359702141802
shapiro_w  =  0.860224843025
skewness  =  -0.619497130515
slope_per10  =  -0.273664072613
slope_per90  =  0.39021217581
stetson_k  =  0.734180965891
weighted_mean  =  15.12343917
weighted_std  =  0.350686979635
