-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  CEPH_1O
class_probability =  0.33


######### Lightcurve features #########

amplitude  =  0.445860058778
cusum  =  0.171004673719
eta  =  0.559152511048
hl_amp_ratio  =  0.496972666725
kurtosis  =  -1.40059826509
n_points  =  210
period  =  0.924715596659
period_SNR  =  15.1725151076
period_log10FAP  =  -24.2754725381
period_uncertainty  =  0.000351068992876
phase_cusum  =  0.278916236993
phase_eta  =  0.377761686988
phi21  =  1.61735584288
phi31  =  3.80448226909
quartile31  =  0.785
r21  =  0.170981644484
r31  =  0.193067197592
shapiro_w  =  0.885968983173
skewness  =  -0.353480038841
slope_per10  =  -0.103909996804
slope_per90  =  0.223803811077
stetson_k  =  0.849921942988
weighted_mean  =  12.6922857143
weighted_std  =  0.398827465126
