-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.215005072657
cusum  =  0.14375051595
eta  =  0.614599564353
hl_amp_ratio  =  0.495737651986
kurtosis  =  -0.878075374822
n_points  =  300
period  =  0.590790520373
period_SNR  =  45.0015920878
period_log10FAP  =  -42.6889321886
period_uncertainty  =  0.000100460912932
phase_cusum  =  0.270470468004
phase_eta  =  0.0861755463721
phi21  =  -2.23522393663
phi31  =  -3.97265643353
quartile31  =  0.35
r21  =  0.434118042226
r31  =  0.357111153403
shapiro_w  =  0.928172111511
skewness  =  -0.242404192396
slope_per10  =  -0.249970536267
slope_per90  =  0.242365395506
stetson_k  =  0.810952156686
weighted_mean  =  15.5968729151
weighted_std  =  0.198083344803
