-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.97


######### Lightcurve features #########

amplitude  =  0.39064447645
cusum  =  0.108781721735
eta  =  0.631378756884
hl_amp_ratio  =  0.27909710462
kurtosis  =  0.379458721623
n_points  =  469
period  =  0.596341227704
period_SNR  =  48.2484343253
period_log10FAP  =  -53.7819691334
period_uncertainty  =  0.000100340093538
phase_cusum  =  0.225877589169
phase_eta  =  0.310701184439
phi21  =  0.666934230366
phi31  =  2.07733635269
quartile31  =  0.53
r21  =  0.468003176479
r31  =  0.27793424675
shapiro_w  =  0.865946412086
skewness  =  -1.11585372925
slope_per10  =  -0.0585568836843
slope_per90  =  0.0939455317773
stetson_k  =  0.701970689286
weighted_mean  =  12.9142210469
weighted_std  =  0.355782144163
