-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.72


######### Lightcurve features #########

amplitude  =  0.319019791199
cusum  =  0.189815531032
eta  =  0.623194983193
hl_amp_ratio  =  0.719621386103
kurtosis  =  -1.29523846832
n_points  =  98
period  =  0.542164705074
period_SNR  =  13.4026629632
period_log10FAP  =  -7.07376325681
period_uncertainty  =  0.000130310161732
phase_cusum  =  0.276011507136
phase_eta  =  0.249754559508
phi21  =  -2.08738769242
phi31  =  -0.707863819625
quartile31  =  0.495
r21  =  0.486916903591
r31  =  0.381300397968
shapiro_w  =  0.905750572681
skewness  =  -0.331221551725
slope_per10  =  -0.157583582077
slope_per90  =  0.626006684555
stetson_k  =  0.879128747794
weighted_mean  =  15.4892471302
weighted_std  =  0.28137988177
