-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.86


######### Lightcurve features #########

amplitude  =  0.356994941204
cusum  =  0.0984525700094
eta  =  0.475004250071
hl_amp_ratio  =  0.483147355358
kurtosis  =  -0.832744152639
n_points  =  232
period  =  0.658331424677
period_SNR  =  29.7319743408
period_log10FAP  =  -25.7729364273
period_uncertainty  =  0.000179465702478
phase_cusum  =  0.277493841657
phase_eta  =  0.100753063949
phi21  =  -2.27220354289
phi31  =  -1.28684755298
quartile31  =  0.5625
r21  =  0.612638432601
r31  =  0.390801973179
shapiro_w  =  0.909909427166
skewness  =  -0.633177353497
slope_per10  =  -0.27493027869
slope_per90  =  0.436000002082
stetson_k  =  0.775338253973
weighted_mean  =  13.0436068237
weighted_std  =  0.351551956313
