-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.93


######### Lightcurve features #########

amplitude  =  0.124771754306
cusum  =  0.173676648174
eta  =  0.601993896359
hl_amp_ratio  =  0.873322084991
kurtosis  =  -0.591245464287
n_points  =  207
period  =  0.721907428184
period_SNR  =  32.7367595808
period_log10FAP  =  -26.7862639056
period_uncertainty  =  0.00022818352793
phase_cusum  =  0.263531726637
phase_eta  =  0.39345215298
phi21  =  1.22560837642
phi31  =  -0.908126466763
quartile31  =  0.14
r21  =  0.322615828125
r31  =  0.139836495658
shapiro_w  =  0.977674603462
skewness  =  -0.13324180987
slope_per10  =  -0.64458547533
slope_per90  =  0.671332051402
stetson_k  =  0.833583434051
weighted_mean  =  13.9246389393
weighted_std  =  0.0872989916544
