<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.74


######### Lightcurve features #########

amplitude  =  0.32053214689
cusum  =  0.106110568722
eta  =  0.6497980198
hl_amp_ratio  =  0.529493642328
kurtosis  =  -0.53742577308
n_points  =  354
period  =  0.588050398963
period_SNR  =  41.8667322996
period_log10FAP  =  -41.1015465959
period_uncertainty  =  0.000117305091235
phase_cusum  =  0.209470668133
phase_eta  =  0.788083356841
phi21  =  -2.00839453388
phi31  =  -2.87683306279
quartile31  =  0.4375
r21  =  0.192332611078
r31  =  0.157956705595
shapiro_w  =  0.955930113792
skewness  =  -0.562410027586
slope_per10  =  -0.0623233805224
slope_per90  =  0.083755136413
stetson_k  =  0.790292692712
weighted_mean  =  12.3308757062
weighted_std  =  0.305067504482
</pre></body></html>