-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.317341439283
cusum  =  0.181886970148
eta  =  0.700248665864
hl_amp_ratio  =  0.354252413677
kurtosis  =  -0.503371559588
n_points  =  263
period  =  0.519504286814
period_SNR  =  34.2973580389
period_log10FAP  =  -26.4555390572
period_uncertainty  =  0.000100000828886
phase_cusum  =  0.265817063508
phase_eta  =  0.315952174174
phi21  =  0.693471537654
phi31  =  -1.27051359006
quartile31  =  0.43
r21  =  0.529388709581
r31  =  0.345954679512
shapiro_w  =  0.920547068119
skewness  =  -0.719667495192
slope_per10  =  -0.114318576835
slope_per90  =  0.0985814357825
stetson_k  =  0.717216322187
weighted_mean  =  14.6535369313
weighted_std  =  0.319939258869
