-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.21


######### Lightcurve features #########

amplitude  =  0.214506342406
cusum  =  0.100945635145
eta  =  0.621461135639
hl_amp_ratio  =  0.83665649406
kurtosis  =  -0.196393911383
n_points  =  338
period  =  3.00289432821
period_SNR  =  31.9158260914
period_log10FAP  =  -30.4864326601
period_uncertainty  =  0.00301092648448
phase_cusum  =  0.198426984892
phase_eta  =  0.632583272992
phi21  =  -1.29592425719
phi31  =  -1.0884237054
quartile31  =  0.3275
r21  =  0.248576782959
r31  =  0.15399529598
shapiro_w  =  0.980875790119
skewness  =  -0.0363464864818
slope_per10  =  -0.407143398471
slope_per90  =  0.614385617589
stetson_k  =  0.827983318711
weighted_mean  =  11.3968343195
weighted_std  =  0.210574817144
