-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.65


######### Lightcurve features #########

amplitude  =  0.127655984397
cusum  =  0.411165875346
eta  =  1.06652215147
hl_amp_ratio  =  0.273619806478
kurtosis  =  -0.957287319458
n_points  =  12
period  =  0.709512670698
period_SNR  =  4.14760584416
period_log10FAP  =  0.0
period_uncertainty  =  0.000156925545905
phase_cusum  =  0.411165875346
phase_eta  =  1.16797181954
phi21  =  -0.597127786065
phi31  =  -1.1814280342
quartile31  =  0.235
r21  =  1.02852930076
r31  =  0.572474822635
shapiro_w  =  0.772578716278
skewness  =  -0.867729900235
slope_per10  =  -2.30799042142
slope_per90  =  2.01778595413
stetson_k  =  0.70606848952
weighted_mean  =  8.145
weighted_std  =  0.167207455974
