-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.317250035604
cusum  =  0.154898879256
eta  =  0.464589984155
hl_amp_ratio  =  0.488356453881
kurtosis  =  -0.403675213654
n_points  =  290
period  =  0.500669836498
period_SNR  =  34.7671401135
period_log10FAP  =  -29.6772196474
period_uncertainty  =  0.000100536115718
phase_cusum  =  0.215866901615
phase_eta  =  0.641294919548
phi21  =  3.79329450144
phi31  =  4.23931269363
quartile31  =  0.4575
r21  =  0.38470131534
r31  =  0.179914583501
shapiro_w  =  0.919163644314
skewness  =  -0.736296630995
slope_per10  =  -0.0839570854471
slope_per90  =  0.127716582695
stetson_k  =  0.775156049168
weighted_mean  =  15.3828335333
weighted_std  =  0.301185772598
