-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.294731675714
cusum  =  0.114696289974
eta  =  0.521334844921
hl_amp_ratio  =  0.589987096808
kurtosis  =  -0.85045434158
n_points  =  371
period  =  0.66797055186
period_SNR  =  48.660804646
period_log10FAP  =  -52.1550770366
period_uncertainty  =  0.000151490154116
phase_cusum  =  0.269753424648
phase_eta  =  0.123550667107
phi21  =  1.19485579886
phi31  =  -0.609286640111
quartile31  =  0.375
r21  =  0.456899098484
r31  =  0.229241491703
shapiro_w  =  0.941166996956
skewness  =  -0.498944531639
slope_per10  =  -0.126040466459
slope_per90  =  0.213375820046
stetson_k  =  0.786096235214
weighted_mean  =  15.7400740037
weighted_std  =  0.247510928362
