-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.211645741113
cusum  =  0.140493845956
eta  =  0.482999857666
hl_amp_ratio  =  0.473207195596
kurtosis  =  -0.188779288752
n_points  =  272
period  =  0.668140645528
period_SNR  =  28.8358736018
period_log10FAP  =  -27.9103708604
period_uncertainty  =  0.000126695363432
phase_cusum  =  0.191810561184
phase_eta  =  0.343828885425
phi21  =  1.11280068568
phi31  =  2.21431447571
quartile31  =  0.2725
r21  =  0.502751288926
r31  =  0.221697093932
shapiro_w  =  0.944634497166
skewness  =  -0.661734860144
slope_per10  =  -0.179524996784
slope_per90  =  0.214964616666
stetson_k  =  0.743413805614
weighted_mean  =  12.5992118227
weighted_std  =  0.202731335861
