-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.227817737854
cusum  =  0.127266135974
eta  =  0.763375780251
hl_amp_ratio  =  0.7351091443
kurtosis  =  -0.727684976929
n_points  =  396
period  =  0.600909911718
period_SNR  =  49.9091622819
period_log10FAP  =  -47.3143395409
period_uncertainty  =  0.000100479888945
phase_cusum  =  0.215577353482
phase_eta  =  0.413575059667
phi21  =  1.03267739945
phi31  =  2.22221806044
quartile31  =  0.3125
r21  =  0.459683605149
r31  =  0.267280092861
shapiro_w  =  0.980042278767
skewness  =  -0.256888200083
slope_per10  =  -0.0965036666247
slope_per90  =  0.0830827647206
stetson_k  =  0.810582442751
weighted_mean  =  17.6046841935
weighted_std  =  0.201391049719
