-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.68


######### Lightcurve features #########

amplitude  =  0.325672412919
cusum  =  0.188274690057
eta  =  0.58012915817
hl_amp_ratio  =  0.465702443483
kurtosis  =  -1.08500023332
n_points  =  108
period  =  0.548963471546
period_SNR  =  18.8125117268
period_log10FAP  =  -13.7317247685
period_uncertainty  =  0.000116133593424
phase_cusum  =  0.268370281873
phase_eta  =  0.145562471869
phi21  =  4.10289955999
phi31  =  2.61285332757
quartile31  =  0.38
r21  =  0.51007963659
r31  =  0.162730608791
shapiro_w  =  0.902500748634
skewness  =  -0.515834793293
slope_per10  =  -0.186301643664
slope_per90  =  0.696150020231
stetson_k  =  0.787602473913
weighted_mean  =  14.3242358438
weighted_std  =  0.226096837009
