-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.97


######### Lightcurve features #########

amplitude  =  0.195033385718
cusum  =  0.0959341851928
eta  =  0.613749888168
hl_amp_ratio  =  0.903181595584
kurtosis  =  -1.39518208699
n_points  =  286
period  =  0.604829253587
period_SNR  =  45.9116789117
period_log10FAP  =  -41.2838953652
period_uncertainty  =  0.00010478677599
phase_cusum  =  0.282574861093
phase_eta  =  0.0298527325288
phi21  =  1.06849493518
phi31  =  2.60648668199
quartile31  =  0.32
r21  =  0.477125768534
r31  =  0.279147857844
shapiro_w  =  0.930515646935
skewness  =  -0.0721425346361
slope_per10  =  -0.280049043112
slope_per90  =  0.380035068344
stetson_k  =  0.89320557123
weighted_mean  =  14.2690532622
weighted_std  =  0.170178964531
