-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.87


######### Lightcurve features #########

amplitude  =  0.251485475765
cusum  =  0.106552711512
eta  =  0.966606121632
hl_amp_ratio  =  0.839485433506
kurtosis  =  -1.00563230259
n_points  =  118
period  =  0.803719420799
period_SNR  =  24.0660930091
period_log10FAP  =  -13.0437790004
period_uncertainty  =  0.000201716561941
phase_cusum  =  0.291272123795
phase_eta  =  0.261702772728
phi21  =  -1.68113269082
phi31  =  -3.55509991683
quartile31  =  0.3775
r21  =  0.386418159361
r31  =  0.156753622764
shapiro_w  =  0.970784902573
skewness  =  -0.0639355895518
slope_per10  =  -0.374552334977
slope_per90  =  0.675073338362
stetson_k  =  0.860263240974
weighted_mean  =  11.9758915835
weighted_std  =  0.224724170001
