-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.92


######### Lightcurve features #########

amplitude  =  0.366260228466
cusum  =  0.137744642995
eta  =  1.03696303169
hl_amp_ratio  =  0.282927668824
kurtosis  =  -0.35792250344
n_points  =  169
period  =  0.586293483146
period_SNR  =  30.8085128673
period_log10FAP  =  -17.4855900005
period_uncertainty  =  0.000156825872002
phase_cusum  =  0.353128247667
phase_eta  =  0.256231426461
phi21  =  0.736042449707
phi31  =  2.15377946118
quartile31  =  0.5
r21  =  0.514377442057
r31  =  0.301818063622
shapiro_w  =  0.896666884422
skewness  =  -0.76070333064
slope_per10  =  -0.176578370641
slope_per90  =  0.394341208473
stetson_k  =  0.701185346363
weighted_mean  =  13.5401401338
weighted_std  =  0.319164045182
