-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.347879950992
cusum  =  0.176742815092
eta  =  0.400177400571
hl_amp_ratio  =  0.562367860764
kurtosis  =  -0.174819247646
n_points  =  347
period  =  0.667419642469
period_SNR  =  33.9378750615
period_log10FAP  =  -34.3315171828
period_uncertainty  =  0.000120997038348
phase_cusum  =  0.202749142221
phase_eta  =  0.207182428197
phi21  =  4.11471906969
phi31  =  5.45920797313
quartile31  =  0.35
r21  =  0.537214817291
r31  =  0.24870667498
shapiro_w  =  0.932796061039
skewness  =  -0.768508800299
slope_per10  =  -0.102130922811
slope_per90  =  0.245600007474
stetson_k  =  0.749590302986
weighted_mean  =  12.9326926829
weighted_std  =  0.278155191277
