-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.284155275171
cusum  =  0.0924347138331
eta  =  0.784459239656
hl_amp_ratio  =  0.319609820069
kurtosis  =  -0.308912719787
n_points  =  213
period  =  0.605334744331
period_SNR  =  28.4140723877
period_log10FAP  =  -22.0654974025
period_uncertainty  =  0.000134578651456
phase_cusum  =  0.252094082375
phase_eta  =  0.176082533168
phi21  =  -2.28720542345
phi31  =  -0.906771284858
quartile31  =  0.34
r21  =  0.534859689568
r31  =  0.351275825824
shapiro_w  =  0.871831774712
skewness  =  -0.923644529661
slope_per10  =  -0.164275382233
slope_per90  =  0.308166665491
stetson_k  =  0.686556485886
weighted_mean  =  10.2931088489
weighted_std  =  0.242880388707
