-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.95


######### Lightcurve features #########

amplitude  =  0.214529661527
cusum  =  0.228918420292
eta  =  0.808480204621
hl_amp_ratio  =  0.794385875824
kurtosis  =  0.302350632545
n_points  =  80
period  =  0.600782925797
period_SNR  =  13.2506310125
period_log10FAP  =  -6.98022549196
period_uncertainty  =  0.000195524947743
phase_cusum  =  0.220676317936
phase_eta  =  0.431311728627
phi21  =  -2.19197815637
phi31  =  -4.11448276485
quartile31  =  0.205
r21  =  0.438626758008
r31  =  0.265985614767
shapiro_w  =  0.961567223072
skewness  =  -0.635643005735
slope_per10  =  -0.34380001016
slope_per90  =  0.296410335679
stetson_k  =  0.772670121445
weighted_mean  =  16.0700364221
weighted_std  =  0.141465704126
