-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.178669480906
cusum  =  0.239263023036
eta  =  0.478027308309
hl_amp_ratio  =  0.783884381141
kurtosis  =  -1.35667105137
n_points  =  286
period  =  0.635211872771
period_SNR  =  45.185534584
period_log10FAP  =  -41.2779644272
period_uncertainty  =  0.00011557712754
phase_cusum  =  0.226956065613
phase_eta  =  0.255663867386
phi21  =  0.970425810681
phi31  =  -0.322806390681
quartile31  =  0.27
r21  =  0.340314219898
r31  =  0.171223352336
shapiro_w  =  0.932171165943
skewness  =  -0.144724590366
slope_per10  =  -0.203868989715
slope_per90  =  0.221313084244
stetson_k  =  0.878089396287
weighted_mean  =  13.6712596067
weighted_std  =  0.149599426464
