-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.296684181464
cusum  =  0.111069195595
eta  =  0.564268125206
hl_amp_ratio  =  0.38568845229
kurtosis  =  -0.511117560473
n_points  =  245
period  =  0.562851697531
period_SNR  =  39.1686046569
period_log10FAP  =  -31.9905023215
period_uncertainty  =  0.000108574791373
phase_cusum  =  0.245890380718
phase_eta  =  0.302313584967
phi21  =  0.944785688559
phi31  =  1.92740086229
quartile31  =  0.41
r21  =  0.410137300041
r31  =  0.168475610039
shapiro_w  =  0.924416065216
skewness  =  -0.708697344862
slope_per10  =  -0.0882845062249
slope_per90  =  0.309700633405
stetson_k  =  0.753603575152
weighted_mean  =  13.1498460954
weighted_std  =  0.269078756901
