-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.315167473587
cusum  =  0.190884421245
eta  =  0.564758023317
hl_amp_ratio  =  0.379340455115
kurtosis  =  -0.536211555208
n_points  =  196
period  =  0.529399562965
period_SNR  =  22.5153894162
period_log10FAP  =  -17.5221018064
period_uncertainty  =  0.000123058947231
phase_cusum  =  0.280567562093
phase_eta  =  0.498568169604
phi21  =  0.679439440897
phi31  =  2.04215448649
quartile31  =  0.4725
r21  =  0.441181743386
r31  =  0.255278996304
shapiro_w  =  0.894782006741
skewness  =  -0.772975233401
slope_per10  =  -0.255547185273
slope_per90  =  0.234332834514
stetson_k  =  0.742981338666
weighted_mean  =  14.5266245096
weighted_std  =  0.313137598636
