-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.82


######### Lightcurve features #########

amplitude  =  0.198024560882
cusum  =  0.138612463654
eta  =  0.53198143066
hl_amp_ratio  =  1.20839019224
kurtosis  =  -1.15380059088
n_points  =  237
period  =  0.742948284923
period_SNR  =  33.3351325094
period_log10FAP  =  -33.8049490511
period_uncertainty  =  0.000124739473785
phase_cusum  =  0.241651511162
phase_eta  =  0.0903880022014
phi21  =  -1.7493433264
phi31  =  -3.42859828288
quartile31  =  0.24
r21  =  0.420884916884
r31  =  0.215550616042
shapiro_w  =  0.949469804764
skewness  =  0.0819475188749
slope_per10  =  -0.267984536005
slope_per90  =  0.533485470295
stetson_k  =  0.854327755956
weighted_mean  =  14.39467119
weighted_std  =  0.162400913824
