-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.253890838949
cusum  =  0.156218058941
eta  =  0.906910803142
hl_amp_ratio  =  0.666316105755
kurtosis  =  -0.466701450967
n_points  =  463
period  =  0.552801656892
period_SNR  =  57.9743722361
period_log10FAP  =  -51.149735993
period_uncertainty  =  0.000102377000281
phase_cusum  =  0.190390189032
phase_eta  =  0.520335607323
phi21  =  0.750486504857
phi31  =  1.7087583203
quartile31  =  0.34
r21  =  0.446503566972
r31  =  0.229651124917
shapiro_w  =  0.978909671307
skewness  =  -0.318011786255
slope_per10  =  -0.0582402276565
slope_per90  =  0.0468545741383
stetson_k  =  0.765475225025
weighted_mean  =  18.1355427316
weighted_std  =  0.237365242103
