-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.98


######### Lightcurve features #########

amplitude  =  0.249960432806
cusum  =  0.0976469782116
eta  =  0.739623735214
hl_amp_ratio  =  0.59307047665
kurtosis  =  -1.03049600192
n_points  =  234
period  =  0.617832389327
period_SNR  =  34.2182603855
period_log10FAP  =  -27.1841088307
period_uncertainty  =  0.000140501611874
phase_cusum  =  0.21623980775
phase_eta  =  0.372779120265
phi21  =  -2.10061005823
phi31  =  -3.84698402461
quartile31  =  0.3775
r21  =  0.464223382235
r31  =  0.182304038745
shapiro_w  =  0.952820658684
skewness  =  -0.288955550498
slope_per10  =  -0.178703649282
slope_per90  =  0.314357896944
stetson_k  =  0.829976202738
weighted_mean  =  14.253199514
weighted_std  =  0.228348104169
