-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.22094227446
cusum  =  0.121021735704
eta  =  0.522272759444
hl_amp_ratio  =  0.497251326933
kurtosis  =  -0.616949190711
n_points  =  396
period  =  0.689124482283
period_SNR  =  51.3008431207
period_log10FAP  =  -55.6597189342
period_uncertainty  =  0.000132147830522
phase_cusum  =  0.297371180545
phase_eta  =  0.241313444634
phi21  =  -2.08855978916
phi31  =  -0.796156663755
quartile31  =  0.28
r21  =  0.390526049939
r31  =  0.200803050001
shapiro_w  =  0.938071787357
skewness  =  -0.621649221694
slope_per10  =  -0.152165534293
slope_per90  =  0.175820164095
stetson_k  =  0.777300993225
weighted_mean  =  16.62213398
weighted_std  =  0.18583213497
