-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.275102143645
cusum  =  0.175369024228
eta  =  0.645818593189
hl_amp_ratio  =  0.648701834308
kurtosis  =  -0.979203853649
n_points  =  263
period  =  0.568206463383
period_SNR  =  42.8982380721
period_log10FAP  =  -35.2017027372
period_uncertainty  =  0.000146501611138
phase_cusum  =  0.294073144933
phase_eta  =  0.224035562543
phi21  =  -2.14244842713
phi31  =  -4.11766347496
quartile31  =  0.41
r21  =  0.363618987684
r31  =  0.326898896649
shapiro_w  =  0.96065723896
skewness  =  -0.203205746909
slope_per10  =  -0.105696040812
slope_per90  =  0.148690654598
stetson_k  =  0.802997336285
weighted_mean  =  16.7816231322
weighted_std  =  0.24661811922
