-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.248086813713
cusum  =  0.145386052255
eta  =  0.784965439569
hl_amp_ratio  =  0.661020956733
kurtosis  =  -0.773349152979
n_points  =  430
period  =  0.707073825089
period_SNR  =  42.5044675074
period_log10FAP  =  -41.6525069069
period_uncertainty  =  0.00013991488279
phase_cusum  =  0.269084852167
phase_eta  =  0.346158318282
phi21  =  -2.14265807406
phi31  =  -0.616612741654
quartile31  =  0.38
r21  =  0.608577875977
r31  =  0.388800731533
shapiro_w  =  0.978875219822
skewness  =  -0.234387577866
slope_per10  =  -0.0698965243735
slope_per90  =  0.0670894945277
stetson_k  =  0.80625879716
weighted_mean  =  17.9379764524
weighted_std  =  0.242659049576
