-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  EB_EC
class_probability =  0.32


######### Lightcurve features #########

amplitude  =  0.487621870351
cusum  =  0.426624962868
eta  =  1.37032848014
hl_amp_ratio  =  1.85842125861
kurtosis  =  -1.26600938875
n_points  =  15
period  =  0.723891334724
period_SNR  =  4.46164016062
period_log10FAP  =  0.0
period_uncertainty  =  0.000226499185765
phase_cusum  =  0.334834845894
phase_eta  =  1.31991968579
phi21  =  -1.06577417322
phi31  =  -1.33665855079
quartile31  =  0.465
r21  =  0.106221182989
r31  =  0.0984514259478
shapiro_w  =  0.919507980347
skewness  =  0.254425598229
slope_per10  =  -0.554677244674
slope_per90  =  0.353439119048
stetson_k  =  0.835343244166
weighted_mean  =  15.1099564365
weighted_std  =  0.268823923303
