-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.97


######### Lightcurve features #########

amplitude  =  0.32419235679
cusum  =  0.0888940646899
eta  =  0.506729295703
hl_amp_ratio  =  0.333571367766
kurtosis  =  0.724814469902
n_points  =  251
period  =  0.476021746598
period_SNR  =  38.6788651766
period_log10FAP  =  -27.9628957765
period_uncertainty  =  0.000102823580823
phase_cusum  =  0.271340080909
phase_eta  =  0.470885860383
phi21  =  0.868644569417
phi31  =  1.93756184336
quartile31  =  0.345
r21  =  0.374553066852
r31  =  0.232376761217
shapiro_w  =  0.864885807037
skewness  =  -1.19941039597
slope_per10  =  -0.13870869145
slope_per90  =  0.198099990375
stetson_k  =  0.700904078666
weighted_mean  =  13.3986943352
weighted_std  =  0.278755458179
