-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  EB_ED
class_probability =  0.24


######### Lightcurve features #########

amplitude  =  0.195195272773
cusum  =  0.144174921803
eta  =  1.0586471556
hl_amp_ratio  =  4.20239353236
kurtosis  =  -1.08004287852
n_points  =  482
period  =  2.39562574537
period_SNR  =  11.503799852
period_log10FAP  =  -5.41598439486
period_uncertainty  =  0.00160823495039
phase_cusum  =  0.164615275354
phase_eta  =  1.20675388705
phi21  =  2.0420407569
phi31  =  1.96353270243
quartile31  =  0.75
r21  =  0.39995620557
r31  =  0.0759170612564
shapiro_w  =  0.812054932117
skewness  =  0.759178741595
slope_per10  =  -0.253862314849
slope_per90  =  0.224951623364
stetson_k  =  0.712876528755
weighted_mean  =  16.1021505721
weighted_std  =  0.376814234293
