-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.27313275713
cusum  =  0.131811355618
eta  =  0.888263171191
hl_amp_ratio  =  0.679969938127
kurtosis  =  -0.773600973884
n_points  =  275
period  =  0.672480459867
period_SNR  =  37.6035042577
period_log10FAP  =  -28.2706006975
period_uncertainty  =  0.000155402980075
phase_cusum  =  0.240329029383
phase_eta  =  0.612177610123
phi21  =  1.03552965233
phi31  =  5.24079481199
quartile31  =  0.4
r21  =  0.392386519611
r31  =  0.180780205219
shapiro_w  =  0.966475188732
skewness  =  -0.261195529906
slope_per10  =  -0.104167903606
slope_per90  =  0.271524926756
stetson_k  =  0.829663594216
weighted_mean  =  14.2188269731
weighted_std  =  0.255937230134
