-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.203132123052
cusum  =  0.179879107445
eta  =  0.59788044521
hl_amp_ratio  =  0.73058722061
kurtosis  =  -0.907093154235
n_points  =  266
period  =  0.648519023619
period_SNR  =  43.7401816208
period_log10FAP  =  -35.6981681624
period_uncertainty  =  0.000119283226288
phase_cusum  =  0.202694621585
phase_eta  =  0.206804982796
phi21  =  1.04055145042
phi31  =  -0.745669566982
quartile31  =  0.25
r21  =  0.439338158181
r31  =  0.294162359666
shapiro_w  =  0.956009507179
skewness  =  -0.360232094715
slope_per10  =  -0.196224775539
slope_per90  =  0.207946919217
stetson_k  =  0.805929473324
weighted_mean  =  15.3314280174
weighted_std  =  0.169466996122
