-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  DSCT
class_probability =  0.75


######### Lightcurve features #########

amplitude  =  0.244946103334
cusum  =  0.0808685516023
eta  =  1.74418019022
hl_amp_ratio  =  1.10062977098
kurtosis  =  0.339038338203
n_points  =  213
period  =  0.110509970945
period_SNR  =  10.9055469178
period_log10FAP  =  -0.201199561438
period_uncertainty  =  4.18815186282e-06
phase_cusum  =  0.127777248615
phase_eta  =  1.83043091021
phi21  =  1.60411094638
phi31  =  4.90666471021
quartile31  =  0.72
r21  =  0.238133011161
r31  =  0.337369749142
shapiro_w  =  0.992933869362
skewness  =  0.0611350927882
slope_per10  =  -0.00531671538677
slope_per90  =  0.0053849894736
stetson_k  =  0.787728659307
weighted_mean  =  11.6448356808
weighted_std  =  0.55091609259
