-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.286406658839
cusum  =  0.114371299699
eta  =  0.606031008375
hl_amp_ratio  =  0.422296260228
kurtosis  =  -0.584746686124
n_points  =  454
period  =  0.656534862263
period_SNR  =  48.7264972364
period_log10FAP  =  -56.3413390674
period_uncertainty  =  0.000121553522155
phase_cusum  =  0.288938269198
phase_eta  =  0.39561174502
phi21  =  0.908540846399
phi31  =  -1.11527269891
quartile31  =  0.3775
r21  =  0.455714421337
r31  =  0.258545630639
shapiro_w  =  0.930233299732
skewness  =  -0.581657871962
slope_per10  =  -0.11564232157
slope_per90  =  0.184050197131
stetson_k  =  0.766713459121
weighted_mean  =  14.1565706331
weighted_std  =  0.241954126551
