-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.254232292467
cusum  =  0.172644241086
eta  =  0.596926410932
hl_amp_ratio  =  0.554280382686
kurtosis  =  -0.74626849739
n_points  =  261
period  =  0.621144069767
period_SNR  =  39.5931898783
period_log10FAP  =  -30.3353665659
period_uncertainty  =  0.000109425707891
phase_cusum  =  0.329849611205
phase_eta  =  0.252565849274
phi21  =  0.896787835677
phi31  =  -0.917372573306
quartile31  =  0.36
r21  =  0.547351202672
r31  =  0.260191118198
shapiro_w  =  0.949397861958
skewness  =  -0.508284965651
slope_per10  =  -0.162658139407
slope_per90  =  0.172897662967
stetson_k  =  0.765339433656
weighted_mean  =  16.1415224869
weighted_std  =  0.236737808692
