-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.319609102976
cusum  =  0.164218075026
eta  =  0.712077343163
hl_amp_ratio  =  0.448984852438
kurtosis  =  -0.925528497001
n_points  =  229
period  =  0.544058281635
period_SNR  =  37.4912134195
period_log10FAP  =  -31.7011369754
period_uncertainty  =  0.000194167862371
phase_cusum  =  0.313680796933
phase_eta  =  0.161331606115
phi21  =  4.05563729048
phi31  =  4.76074246906
quartile31  =  0.47
r21  =  0.40828201637
r31  =  0.29455432737
shapiro_w  =  0.917433381081
skewness  =  -0.497570526141
slope_per10  =  -0.155545931483
slope_per90  =  0.193524450683
stetson_k  =  0.776606511423
weighted_mean  =  16.3246413363
weighted_std  =  0.286794901534
