-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_e
class_probability =  0.77


######### Lightcurve features #########

amplitude  =  0.172838788118
cusum  =  0.0977902949601
eta  =  0.880725565605
hl_amp_ratio  =  0.829003807936
kurtosis  =  0.0635651524973
n_points  =  382
period  =  0.240654344979
period_SNR  =  31.480509611
period_log10FAP  =  -24.9115048784
period_uncertainty  =  1.86144911501e-05
phase_cusum  =  0.173383359607
phase_eta  =  1.31173045691
phi21  =  0.0853773840089
phi31  =  -0.663700019334
quartile31  =  0.2775
r21  =  0.0291568968691
r31  =  0.0363005048444
shapiro_w  =  0.994043052197
skewness  =  -0.0581520572963
slope_per10  =  -0.0272012634559
slope_per90  =  0.0247008170055
stetson_k  =  0.801090464268
weighted_mean  =  11.3108115183
weighted_std  =  0.194371375183
