-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.89


######### Lightcurve features #########

amplitude  =  0.379839113169
cusum  =  0.141285198461
eta  =  0.693134094396
hl_amp_ratio  =  0.62316660628
kurtosis  =  -0.505117775751
n_points  =  181
period  =  0.597236854875
period_SNR  =  26.7244930322
period_log10FAP  =  -20.7103971728
period_uncertainty  =  0.000135427865212
phase_cusum  =  0.222834721002
phase_eta  =  0.178328324332
phi21  =  1.21466452354
phi31  =  2.54004755499
quartile31  =  0.43
r21  =  0.47685133473
r31  =  0.290943249296
shapiro_w  =  0.978524267673
skewness  =  -0.27858007526
slope_per10  =  -0.166494482717
slope_per90  =  0.214080010541
stetson_k  =  0.796160228143
weighted_mean  =  14.770628919
weighted_std  =  0.282852191867
