-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.93


######### Lightcurve features #########

amplitude  =  0.208826636445
cusum  =  0.107736675682
eta  =  0.543692443408
hl_amp_ratio  =  0.659516650599
kurtosis  =  -1.26954397125
n_points  =  342
period  =  0.705754673796
period_SNR  =  45.3024915033
period_log10FAP  =  -48.9349245268
period_uncertainty  =  0.000135732498434
phase_cusum  =  0.238602656322
phase_eta  =  0.188030562357
phi21  =  -1.98717406848
phi31  =  -3.71258166518
quartile31  =  0.32
r21  =  0.410791732615
r31  =  0.156470365118
shapiro_w  =  0.936204195023
skewness  =  -0.202345066371
slope_per10  =  -0.194868156631
slope_per90  =  0.287099999841
stetson_k  =  0.844793433184
weighted_mean  =  14.5564078309
weighted_std  =  0.192549080413
