-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.96


######### Lightcurve features #########

amplitude  =  0.337137244821
cusum  =  0.10225090719
eta  =  0.497837966686
hl_amp_ratio  =  0.38356995403
kurtosis  =  -0.748282802822
n_points  =  242
period  =  0.644835775616
period_SNR  =  36.1354275884
period_log10FAP  =  -30.6283186172
period_uncertainty  =  0.000165052315307
phase_cusum  =  0.29815505862
phase_eta  =  0.0474771580859
phi21  =  0.863207349347
phi31  =  2.00433227899
quartile31  =  0.4725
r21  =  0.530001616335
r31  =  0.348812918149
shapiro_w  =  0.895360469818
skewness  =  -0.718169054197
slope_per10  =  -0.169390651357
slope_per90  =  0.465414674006
stetson_k  =  0.750962625162
weighted_mean  =  14.6500732267
weighted_std  =  0.309820116637
