-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  DSCT
class_probability =  0.51


######### Lightcurve features #########

amplitude  =  0.375361316481
cusum  =  0.138382326292
eta  =  0.742922663895
hl_amp_ratio  =  0.81952853662
kurtosis  =  0.195727554884
n_points  =  126
period  =  0.181553655321
period_SNR  =  14.7709692935
period_log10FAP  =  -10.6146888708
period_uncertainty  =  1.05460435967e-05
phase_cusum  =  0.229456772701
phase_eta  =  0.648203579877
phi21  =  -1.79681257311
phi31  =  -3.32705724379
quartile31  =  0.4775
r21  =  0.316219132274
r31  =  0.293021055831
shapiro_w  =  0.931776821613
skewness  =  -0.793216305443
slope_per10  =  -0.11753333422
slope_per90  =  0.0452832203855
stetson_k  =  0.817146086005
weighted_mean  =  11.2392857143
weighted_std  =  0.334567189189
