-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.72


######### Lightcurve features #########

amplitude  =  0.375823802266
cusum  =  0.24867892523
eta  =  0.422584091245
hl_amp_ratio  =  0.511854855519
kurtosis  =  0.285432465587
n_points  =  80
period  =  0.675348835482
period_SNR  =  12.1041348013
period_log10FAP  =  -6.2561467417
period_uncertainty  =  0.000144157459234
phase_cusum  =  0.3100152044
phase_eta  =  0.380853871226
phi21  =  -2.54282705773
phi31  =  -1.36615056187
quartile31  =  0.34
r21  =  0.486069759576
r31  =  0.212912295413
shapiro_w  =  0.907658576965
skewness  =  -0.954494786895
slope_per10  =  -0.168867054784
slope_per90  =  0.75210000854
stetson_k  =  0.736557487923
weighted_mean  =  12.951408499
weighted_std  =  0.277791959097
