<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.78


######### Lightcurve features #########

amplitude  =  0.201780888054
cusum  =  0.198170335073
eta  =  0.686495691664
hl_amp_ratio  =  0.468113205774
kurtosis  =  -0.0529947305049
n_points  =  288
period  =  0.582698835548
period_SNR  =  42.8649102012
period_log10FAP  =  -35.8673814954
period_uncertainty  =  9.72591219009e-05
phase_cusum  =  0.254311352793
phase_eta  =  0.456114266485
phi21  =  -2.51445527607
phi31  =  -4.97938353106
quartile31  =  0.22
r21  =  0.305958737685
r31  =  0.114704139819
shapiro_w  =  0.939807653427
skewness  =  -0.665518069717
slope_per10  =  -0.167700509519
slope_per90  =  0.201375846576
stetson_k  =  0.754529648465
weighted_mean  =  15.3216937573
weighted_std  =  0.1526788607
</pre></body></html>