-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.257401604941
cusum  =  0.137430069406
eta  =  0.635924440083
hl_amp_ratio  =  0.738300581239
kurtosis  =  -0.554518896011
n_points  =  222
period  =  0.576114213294
period_SNR  =  33.1319264712
period_log10FAP  =  -24.0088624896
period_uncertainty  =  0.000141412430443
phase_cusum  =  0.260441292426
phase_eta  =  0.350773268271
phi21  =  -2.13450260246
phi31  =  -3.95768268137
quartile31  =  0.33
r21  =  0.513506366828
r31  =  0.276057537605
shapiro_w  =  0.977152347565
skewness  =  -0.2535938595
slope_per10  =  -0.14276679984
slope_per90  =  0.179976147378
stetson_k  =  0.818237771009
weighted_mean  =  16.1678438995
weighted_std  =  0.201819115344
