-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.94


######### Lightcurve features #########

amplitude  =  0.340475257595
cusum  =  0.18014245326
eta  =  0.664871887279
hl_amp_ratio  =  0.284429333497
kurtosis  =  -0.973891502956
n_points  =  209
period  =  0.616789151155
period_SNR  =  33.1410713895
period_log10FAP  =  -27.6388352395
period_uncertainty  =  0.000142918633877
phase_cusum  =  0.281650463652
phase_eta  =  0.0965261222708
phi21  =  -2.18312300657
phi31  =  -3.87689363698
quartile31  =  0.46
r21  =  0.416853270523
r31  =  0.256067990335
shapiro_w  =  0.903365671635
skewness  =  -0.580764556447
slope_per10  =  -0.147574763493
slope_per90  =  0.308841052791
stetson_k  =  0.73222003075
weighted_mean  =  12.8846605403
weighted_std  =  0.2993460656
